dSelect Wiring File
 
This menu displays all currently available wirings. If you wish
to create a new wiring, press "A". If you wish to edit a wiring,
select the wiring and press "E". If you wish to delete a wiring,
select the wiring and press "D". Press Escape to exit.
 
eDescription
 
This option allows you to change or give the wiring a descriptive
name of up to 30 characters. This name is only used for your
reference.
 
fGutter
 
This option allows you to specify the gutter between the displayed
devices. The number may range from 0 to 255 and indicates the
number of blank pixel lines to be left between devices.
 
gDevice #1-4
 
This option allows you to specify which devices you wish to use
and the order in which they should be displayed. Device #1 is
displayed first, device #2 is displayed second, and so on. You
may select <none> for one or more devices if you wish to use
less than 4 devices. However, you should at least specify one
device.
 
NOTE: Only specify one of each type of device. For example: Don't
specify two Mixers or two Peak Analyzers.
 
hAdd Wiring
 
Please enter the name of the new wiring you wish to create. Do
not enter an extension. The extension ".WIR" will be given.
 

 